/*Table structure for table `cubetp` */

DROP TABLE IF EXISTS `cubetp`;

CREATE TABLE `cubetp` (
  `name` varchar(100) NOT NULL,
  `x` int(10) NOT NULL,
  `y` int(10) NOT NULL,
  `z` int(10) NOT NULL
) ENGINE=InnoDB DEFAULT CHARSET=latin1;
